; HTBmeter.def : Declares the module parameters for the DLL.

LIBRARY      "HTBmeter"
DESCRIPTION  'HTBmeter Windows Dynamic Link Library'

EXPORTS
    ; Explicit exports can go here

	Meter
	Closemeter